4500 5000 5500 6000 6500 7000

1.00E-015

2.00E-015

3.00E-015

4.00E-015

Calibrated flux

Wavelength (angstroms)

HRG 2304 (NED02)

NaID

MgIb H

G

TiO TiO

MgH