0.0 0.9 1.8 2.7 3.6 4.5 2.2

2.4

2.6

2.8 CH_4

N_0

N_0

2.66 x 10^{18}molecules/cm^2

1 +

4 - 4202 cm^{-1}

3 - 3009 cm^{-1}

2 +

4 - 2815 cm^{-1}

3 +

4 - 4300 cm^{-1}

4 - 1300 cm^{-1}

Column density (10^{18} molecules/cm^2)

Fluence (10^{13} impacts/cm^2)

a)