NGC 4569 XMM-Newton MOS1+MOS2+pn 0.2 - 1 keV on DSS blue

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

12 37 30 15 00 36 45 30 15 00

13 18161412100806040200 12 58