NGC 4388 H I on XMM-Newton MOS1+MOS2+pn 0.2 - 1 keV

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

12 27 00 26 45 30 15 00 25 45 30

13 00 12 5550454035