NGC 4501 XMM-Newton MOS1+MOS2+pn 0.2 - 1 keV on DSS blue

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

12 32 20 15 10 05 00 31 55 50 45

14 31302928272625242322