(V - I)_0

MI

Solid: Dartmouth isochrones -1.99, -1.37, -1.23, -1.15 -0.7 Dashed: GCs analytic fits ZW84 -1.99, -1.37, -1.23, -1.15 -0.7 1 1.5 2 2.5

-3.5 -3 -2.5 -2 -1.5 -1 -0.5 0