(V - I)_0

MI

Solid: Dartmouth isochrones -2.11, -1.67, -1.53, -1.33 -0.71 Dashed: GCs analytic fits CG97 -2.11, -1.67, -1.53, -1.33 -0.71 1 1.5 2 2.5

-3.5 -3 -2.5 -2 -1.5 -1 -0.5 0