0 5 10 15 20 25 30 35 40 0

500

1000

1500

2000

2500

3000

R_{LG}, Mpc

VLG, km s -1

TRGB + Ceph

SBF (Tonry)

ACSFCS+

SNIa (Tonry)

TF (IR)

TF (opt)

N = 98 gg, 0° < θ < 5°