0 2 4 6 8 10 12 14 16 18 20

-1000

-500

0

500

1000

1500

Running medians (w = 1.0 Mpc) from 500 bootstrap realizations

Error band within 90%

All data

Accurate data

TF data

R^{FC}, Mpc

VFC, km s -1

TRGB + Ceph

SBF (Tonry)

ACSFCS+

SNIa (Tonry)

TF (IR)

TF (opt)

N = 109 gg,λ < 45° or λ > 135°

(model of the minor attractor)