NGC660 VLA 4.86GHz TP+PI B-vect. on DSS blue

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

01 43 06 04 02 00 42 58

13 40 00 39 3000 38 3000 37 30 (b)