290.06

290.05

290.04

290.03

290.02

290.01

290.00

-0.89

-0.90

-0.91

-0.92

-0.93

IGRJ11014-6103

Einstein

IGR J11014-6103

SN 1 ARCMIN XRT

Swift/XRT