290.30

290.20

290.10

290.00

289.90

-0.70

-0.80

-0.90

-1.00

4 ARCMIN

XRT

IGRJ11014-6103

290.40

-0.50

-0.60

4 ARCMIN

EPIC-MOS1

IGRJ11014-6103