L = 0.1

L = 0.3

L = 0.6

0.1 1 10 energy [keV]

10^{−4}

10^{−3}

10^{−2}

10^{−1}

10^0

10^1

10^2 flux [photons/cm^2/keV/s]

NT SD M = 10M_⊙, a = 0.65 α = 0.1, inc = 66^∘ h_f = BHSPEC