0:47:00

3046:00

3045:00

44:30

45:00

40:00

35:00

41:30:00

25:00

20:00EPIC PN + MOS

XMM-Newton

0.2 - 4.5 keV

January 2007

M 31 NS2

1872 1868

1863

1851

1846

1844

1841

1836

1834

1832

1825

1822

1821

1816

1813

1807

1806

1804

1800

1792

1791

1789

1788

1786

1784

1783

1781

1776

1773

1772

1769

1766

1761

1759

1755

1750

1748

1747

1743

1742

1740

1739

1737

1736

1733

1732

1731 1730

1729

1727

1726

1725

1723

1722

1721

1717

1716

1713

1709

1708

1707

1705

1703

1699

1697

1695

1694

1692

1687

1685

1682

1681

1678

1675

1666

1665

1661

1660

1652

1649

1647

1643

1642

1640

1637

1636

1635

1634 1631

1626

1628 1624

1619

1616

1612

1611

16101607

1604

1603

1599

1598

1594

1590

1589

1587

1581

1580

1574

1567

1566

1563

1562

1560

1559

1554

1553

1547

1546

1545

1538

1537

1536

1535

1525

1523

1522

1520

1518

1517

1507

1498

1497

1495

1494

1488

14811473

1468

1466

1463

1460

1452

1451

1450

1449

1446

1441

1436

1433

1430

1421

14201415

1406

1399