3046:00

3045:00

300:44:00

42:10:00

05:00

00:00

55:00

41:50:00

45:00EPIC PN + MOS

XMM-Newton

0.2 - 4.5 keV

January 2007

M 31 N2

1656

1835

1833

1830

1828

1821

1818

1812

1810

1809

1805

1803

1802

1801

1799

1795

1794

1793

1791

1785

1784

1780

1772

1771 1768

1767

1765

1763

1762

1760

1754

1753

1751

1749

1747

1744

1742

1741

1738

1732

1728

1724

1720

1718

1716

1714 1712

1711

1710

1706

1704

1702

1698

1696

1693

1692

1691

1690

1689

1688

1685

16841676

1673 1672

1671

1670

1668

1667

1666

1664

1663

1659

1657

1655

1654

1653

1650

1649

1648

1647

1646

1645

1641 1639

1637

1629

1633

1632

1630

1626

1628

1625

1624

1622

1621

1620

1617

1615

1614

1611

1608

1603

1602

1601

1600

1597 1593

1589

1586

1585

1583

1582

1579

1578

1577

1573

1572

1570

1569

1568

1566

1562

1560

1551

1550

1549

1548

1541

1539

1534 1533

1532

1530

1529

1528

1527

1523

1518

1516

1515

1514

1513

1512

1509

1505

1504

1501

1500

1496

1489

1487

1486

1485

1482

1474

1470

1467

1462

1461

1460

1453

1442

1440

1429

1428 1426

14251419

1414

1411

1409

1408

1405

1404

1403

1401

1393

1391

1387

1382

1378

1375

1372

1370

1365

1359

1354

1343

1337

1331

1320

1313