0:46:00

3045:00

3044:00

43:30

25:00

42:20:00

15:00

10:00

05:00

00:00EPIC PN + MOS

XMM-Newton

0.2 - 4.5 keV

January 2007

M 31 NN3

1656

1763

1762

1757

1754

1753

1751

1749

1738

1728

1724

1720

1718

1714

1712

1706

1704

1702

1696

1690

1689

1688

1686

1684

1680

1679

1676

1671

1670

1668

1667

1663

1662

1659

1658

1657

1655

1654

1653

1650

1648

1646 1629

1633

1632

1630

1627

1625

1622

1621

1617

1615

1614

1609

1608

1601

1600

1597

1595

1593

1586

1585

1584

1583

1582

1579

1578

1577

1576

1573

1572

1570

1569

1568

1551

1549

1548

1539

1530

1529

1528

1527

1519

1516

1515

1513

1510

1509

1505

1504

1501

1499

1496

1487

1486

1485

1480

1478

1477

1474

1470

1467

1465

1462

1453

1442

1437

1434

1429

1427

14251419

1418

1417

1414

1413

1411

1409

1408

1405

1403

1393

1391

1387

1382

1380

1375

1370

1359

1354

1343

1339

1330

1320

1314 1313

1308

1306

1300

1295

1274 1270

1268

1264

1247

1243 1235

1204 1198