300:47:00

3046:00

45:30

30:00

42:25:00

20:00

15:00

10:00

05:00EPIC PN + MOS

XMM-Newton

0.2 - 4.5 keV

June 2002

M 31 N3

1883

1656

1947

1946

1945

1944

1943

1940

1939

1938

1937

1936

1934

1933

1928

1926

1924 1922

1921

1919

1916

1914

1913

1912

1908

1907

1906

1904

1902

1901

1900

1899

1896

1895

1894

1893

1890

1889

1888

1884

1881

1877

1875 1873

1870

1866 1864

1862

1861

1860

1858

1857

1856

1855

1854

1853

1852

1849

1848

1847

1845

1843

1840

1839

1838

1837

1833

1829

1826

1823

1819

1818

1817

1815

1811

18101805

1803

1798

1797

1795

1790

1787

1782

1780

1779

1778

1777

1775

1770

1764

1763

1762

1757

1756

1754

1753

1752

1751

1749

1746

1745

1738

1735

1728

1724

1719

1718

1714

1712

1706

1704

1701

1696

1689

1688

1686

1684

1680

1679

1676

1670

1668

1662

1658

1655

1654

1648

1633

1627

1621

1614

1609

1595

1584

1576