48:00

300:47:00

3046:00

45:30

10:00

05:00

42:00:00

55:00

50:00

41:45:00

40:00EPIC PN + MOS

XMM-Newton

0.2 - 4.5 keV

January 2007

M 31 NS3

1883

1948

1942

1941

1935

1932 1931

19291927

1925

1923

1921

1920

1919

1918

1917

1916

1911

1910

1909

1908

1905

1904

1903

1901

1898

1896

1894

1892

1891

1885

1882

1881

1879

1876

1874

1871

1869

1867

1865

1862

1861

1859

1858

1852

1851

1848

1847

1846

1840

1839

1835

1833

1832

1830

1828

1821

1818

1812

1810

1809

1806

1805

1804

1803

1802

1801

1799

1797

1795

1794

1793

1791

1787

1785

1784

1783

1780

1772

1771 1768

1767

1765

1763

1762

1761

1760

1754

1753

1751

1747

1744

1742

1741

1738

1732

1729

1728

1724

1720

1718

1716

1711

1710

1706

1704

1702

1698

1696

1693

1692

1691

1690

1689

1685

16841676

1673 1672

1671

1670

1667

1666

1664

1663

1659

1657

1655

1653

1650

1649

1647

1646

1645

1641 1639

1637

1629 1632

1630

1626

1628

1625

1624

1622

1620

1617

1615

1602

1601

1600

1597

1593

1586

1583