3047:00

3046:00

300:45:00

35:00

30:00

25:00

20:00

41:15:00

10:00EPIC PN + MOS

XMM-Newton

0.2 - 4.5 keV

February 2003

M 31 H4

1930

1915

1897

1887

1886

1880

1878

1872

1868

1863

1850

1846

1844

1842

1841

1836

1834

1831

1825

1824

1822

1820

1816

1814

1813

1807

1800

1796

1792

1789

1788

1786

1781

1776

1774

1773

1769

1766

1759

1758

1755

1750

1748

1743

1740

1739

1737

1736

1734

1733

1731 1730

1729

1727

1726

1725

1723

1722

1721

1717

1715

1713

1709

1708

1707

1705

1703

1699

1697

1695

1694

1687

1683

1682

1681

1678

1677

1675

1669

1665

1661

1652

1651

1643

1642

1640

1638

1636

1634 1631

1623

1619

1616

1612

16101607

1606

1604

1596

1594

1591

1588

1587

1581

1580

1574

1567

1565

1563

1559

1558

1554

1553

1552

1545

1543

1540

1538

1537

1535

1525

1522

1517

1508

1497 1493