0.1 1 10 100 1000

10000

100000

1e+06

1e+11 1e+12 1e+13 1e+14

Flux Density [Jy]

Frequency [Hz]

Variations in the cold temperature

T^{cold}_{dust}=45 K Best fit, T^{cold}_{dust}=32 K T^{cold}_{dust}=25 K