TT

1 10 100 1000 multipole

10^{-10}

10^{-8}

10^{-6}

10^{-4}

10^{-2}

10^0

10^2

10^4

C_l [μK^2]

EE

1 10 100 1000 multipole

10^{-10}

10^{-8}

10^{-6}

10^{-4}

10^{-2}

10^0

10^2

10^4

C_l [μK^2] noise level simulation CMB model White Noise f_{knee}=0.01,α =2 f_{knee}=0.1,α =2 f_{knee}=0.1,α =1

BB

1 10 100 1000 multipole

10^{-10}

10^{-8}

10^{-6}

10^{-4}

10^{-2}

10^0

10^2

10^4

C_l [μK^2]