0 5 10 15 20 25 30 35

19 20 21 22 23 24 25 26

Fitted peak i_M magnitude

Entries

Unidentified sample Identified sample

Entries Mean RMS 310 23.47 0.67

Entries Mean RMS 175 22.60 0.73