0 5 10 15 20 25 30 35 40 45

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Host photometric redshift

Entries

Unidentified sample Identified sample

Entries Mean RMS 310 0.86 0.22

Entries Mean RMS 175 0.60 0.21