0.5 1 1.5 2 2.5

0.65 0.7 0.75 0.8 0.85 0.9 0.95 1 1.05 1.1 1.15

Taxonomic classification for (16960) 1998 QS52

Wavelength [um]

Relative Reflectance

Spectrum Sr Sq Q