0.4 0.6 0.8 1 1.2 1.4 1.6 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2001 SG286

Wavelength [um]

Relative Reflectance

V NIR Liniar fit "D" class