t [sec] frequency [Hz]

0.2 0.4 0.6 0.8 1 1.2 200 400 600 800 1000

-6

-4

-2

0

t [sec]

W15-4: A_x + Rh_x (at pole)

0.2 0.4 0.6 0.8 1 1.2 20 40 60 80 100

-6

-4

-2

0