(a) This plot uses I_0=� = 100. The blue dotted line is the median estimator. The black dashed line is the mean estimator.

(b) This plot uses I_0=� = 8 (a very small value) showing the behavior for p ¿ I_0=�. It is clearly seen that for large p, there is a large probability that the value of p_0 is near the maximum (8 in this case). Fig. 7a would exhibit similar behavior in its large polarization regime near and past p = 100.