-8 -6 -4 -2 0 2 4 6 8 10 12 14 16 18 -16 -15 -14 -13 -12 -11 -10 -9 -8 -7

Log^{10}(E^γ /eV)

Log10( Fγ /erg s

-1 cm-2 )

Fermi

MAGIC

CTA

disc synchr.

Bremsstr. IC pγ pp total data