GSC0856 GJ3305 (09/2011) 2M0443 (if aged 50 Myr)

2M0443 (if aged 120 Myr) V1005 Ori CD571054

BD-21 1074A BD01 2447 2M1139

2M1207 TWA25 TYC7443-1102

AUMic/HIP102409 WWPsA TXPsA

HIP114046 (if aged 100 Myr) HIP114046 (if aged 2000 Myr) BD-13 6424