9 10 11 12 13 14 15 16 17 18 19 36 37 38 39 40 41 42 log(νLν/erg s -1) log(ν/Hz)

NGC 3718

UV and X-rays: XMM-Newton, obs. ID: 0200431301 Optical: HST, F658N and F814W filters