-20 -18 -16 -14 -12 -10 -8 -6 -4 -2 0 -2 -1.5 -1 -0.5 0 0.5 1 1.5x 10

log q

W

T_{eff} = 5600 K TDC,β = (0,0)

convection zone→ ←