(a) ROC curves. Solid lines: rank operator; dashed lines: dilation.

(b) Influence of ȷ on the SIR operator. Solid lines: true positives (left axis); dashed lines: false positives (right axis).

(c) Influence of kernel size on the dilation. Solid lines: true positives (left axis); dashed lines: false positives (right axis).