(a) Spectroscopic (S) Sample, d:o:f: = 3. (b) Photometric (P) Sample, d:o:f: = 4.

(c) Upper limit 1 (UL1) Sample, d:o:f: = 5. (d) Upper limit 2 (UL2) Sample, d:o:f: = 5.