Energy (TeV) 1

)^{-1} TeV -1 s^{-2} dN/dE (cm

-15 10

-14 10

-13 10

-12 10

-11 10 H.E.S.S.

Energy (TeV) -1 10×2 1 2 3 4

th )/N th-N γ(N

-4 -2 0 2 4