Right Ascension

Declination

20’ ° -31

18’ ° -31

16’ ° -31

RASS/BSC position H.E.S.S. fitted position NVSS position Swift/XRT position

s00 m10^h10 s10 m10^h10 s20 m10^h10 s30 m10^h10