1338 1340 1342 1344 0.4

0.8

1.2

Experiment (NaI ablation)

H Pf

Na I 5f 6g

Na I 5g_{9/2} 6h_{11/2}

ACE

Intensity (arb. units)

Wavenumber (cm^{-1})