10 15 20 25 30 35 40 45 50 55 0

0.2

0.4

0.6

0.8

1

1.2

1.4

Velocity [km/s]

Flux / Continuum Flux

W31C

o-NH_3 572 GHz CH (main hfs line) 532 GHz H 21 cm (Fish et al. 2003)