2.2 2.25 2.3 2.35 2.4 2.45 2.5 0

0.02

0.04

0.06

0.08

0.1

0.12

0.14

0.16

0.18

0.2

Vesta

7J:-2A

3J:1S:1A

10J:-3A

4J:-2S:1A

2M:-1A 3J:-1A

2M:-1A

Proper semi-major axis [AU]

Sine of proper inclination

C