0.0001 0.001 0.01 0.1 1 10 300

500

700

900

1100

t / Ma

T / K

1 10 100 300 500 700 900 1.100

1.300 solid porous

t / Ma

D=100 km t_0=2.51 Ma

D=1 km t_0=0.0 Ma