(a) Paff narrow (b) Paff broad (c) [Si vi]

(d) H_2 ˘1.96 ¯m (e) Brfl narrow (f) Brfl broad

(g) H_2 ˘2.12 ¯m (h) [Fe ii] (i) K-band at 2.2 ¯m

(j) H-band at 1.6 ¯m