(a) Bisector measurements of WASP-42 against the measured radial velocity. Black dots denote data points from CORALIE while blue triangles denote points obtained with HARPS.

(b) Bisector measurements of WASP-49 against the measured radial velocity. All data have been obtained with CORALIE.