1 2 3 4 5 6 log(T),log(Ne) a)

-6 -4 -2 0

log distance from shockfront [cm] log O i/O b)

14.5 15 15.5 16 16.5 17 17.5 18 -6 -4 -2 0

log distance from shockfront [cm] log Fe i/Fe c)