0.0 0.2 0.4 0.6 0.8 1.0 1.3 1.4 1.5 1.6 1.7 1.8 1.9 log g = 14.0

f_C

H

Color correction g _{rad} / g

He . X = 0.74, Z = 0.3 Z_O