10^{-7} 10^{-5} 10^{-3} 10^{-1} 10 10^3 10^5 10^7 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1.0

pure H log g = 14.0

1.06 0.95 0.8

0.5

l = 0.1

g_{rad} / g

Column density (g cm^{-2} )