10^{-7} 10^{-5} 10^{-3} 10^{-1} 10 10^3 10^5 10^7 0.3 0.4 0.5 0.6 0.7 0.8 angle averaged angle dependent

- exact RF - approx. RF

Thomson

g_{rad} / g

Column density (g cm^{-2} )