0.0 0.1 0.2 0.3 0.4 0.5 0.6

0.25

0.30

0.35 old new F_{Edd}

pure H log g = 14.0

K ^{-1/4}

Observed flux (10^{-7} erg s^{-1} cm^{-2} )

Observations Model