6 8 10 12 14 16 18 20 0.0 0.5 1.0 1.5 2.0 2.5 3.0 new Pure H

old

D_{10} = 0.53

log g = 14.6 log g = 14.0 log g = 14.3

NS Mass (solar mass)

NS Radius (km)