Fig. 9. Left: cut of the VISIR raw images at 8.59 ¯m along the major axis of the dust shell for the three epochs. An expansion of the dusty material is clearly seen. Right: cut of the VISIR 2011 deconvolved images along the main axis of the dust shell for all filters.