-100 -50 0 50 -60 -40 -20 0 20 40 60 80 100 120 hot H_2

RA Offset (")

Dec Offset (")

VLA1623

HH313A

HH313B

GSS30

Temperature [K]

500 600 700 800 900 1000

1100

1200

1300

1400

1500