924, 926, 930 946, 947, 951 965, 968, 971

930.08

1089.89

Germanium VI

ionization energy 934 800 cm^{-1} 0 1 2 3 4 5 energy / 100 000 cm^{-1}

9 2 S^2 P^2 D^2 D^{o 2} F^2 F^{o 2} G^2 G^{o 4} P^4 D^{o 4} F^4 F^{o 4} G^o